保国寺大殿建筑形制分析与探讨
edition published: 2024-03-12-04:00
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

新平 杨, Xinping Yang, 保国寺大殿建筑形制分析与探讨, 保國寺大殿建築形制分析與探討, Baoguo si da dian jian zhu xing zhi fen xi yu tan tao, Baoguosi dadian jianzhu xingzhi fenxi yu tantao, https://architecturasinica.org/bibl/4QN3JM97, https://www.zotero.org/groups/architecturasinica/items/4QN3JM97, https://www.zotero.org/groups/2267085/items/4QN3JM97, 古建园林技术, 古建園林技術, Gu jian yuan lin ji shu, Gujian yuanlin jishu, 1987, 46-52

杨新平. “保国寺大殿建筑形制分析与探讨.” 古建园林技术, no. 2 (1987): 46–52.

[...]

杨新平, 保国寺大殿建筑形制分析与探讨, 古建园林技术, no. 2 (1987): 46–52.