对少林寺初祖庵大殿的初步分析
edition published: 2024-03-12-04:00
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

英濤 祁, Yingtao, 英涛, 对少林寺初祖庵大殿的初步分析, Dui shao lin si chu zu an da dian de chu bu fen xi, https://architecturasinica.org/bibl/576HH2ZQ, https://www.zotero.org/groups/architecturasinica/items/576HH2ZQ, https://www.zotero.org/groups/2267085/items/576HH2ZQ, 科技史文集, 2, 1979, 61-70

祁英濤. “对少林寺初祖庵大殿的初步分析.” 科技史文集 2, no. 01 (1979): 61–70.

[...]

祁英濤, 对少林寺初祖庵大殿的初步分析, 科技史文集 2, no. 01 (1979): 61–70.