南禪寺大殿修繕工程竣工技術報告
edition published: 2024-03-12-04:00
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

澤俊 柴, 泽俊, Zejun Chai, 南禪寺大殿修繕工程竣工技術報告, Nan chan si da dian xiu shan gong cheng jun gong ji shu bao gao, Nanchansi dadian xiushan gongcheng jungong jishu baogao, https://architecturasinica.org/bibl/79VJTAJH, https://www.zotero.org/groups/architecturasinica/items/79VJTAJH, https://www.zotero.org/groups/2267085/items/79VJTAJH, 柴澤俊古建築文集, Chai Zejun gu jian zhu wen ji, Chai Zejun gujianzhu wenji, 文物出版社, 1999B, 361-372

柴澤俊. “南禪寺大殿修繕工程竣工技術報告.” In 柴澤俊古建築文集, 361–72. 文物出版社, 1999B. http://www.worldcat.org/oclc/885883140.

[...]

柴澤俊, 南禪寺大殿修繕工程竣工技術報告, in 柴澤俊古建築文集 (文物出版社, 1999B), 361–72, http://www.worldcat.org/oclc/885883140.