宋式建筑的构架特点与“减柱”问题
edition published: 2024-03-12-04:00
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

熹年 傅, Xinian Fu, 熹年, 宋式建筑的构架特点与“减柱”问题, 宋式建築的構架特點與“減柱”問題, Song shi jian zhu de gou jia te dian yu jian zhu wen ti, Songshi jianzhu de goujia tedian yu jianzhu wenti, https://architecturasinica.org/bibl/EPX2RPBJ, https://www.zotero.org/groups/architecturasinica/items/EPX2RPBJ, https://www.zotero.org/groups/2267085/items/EPX2RPBJ, 宿白先生八秩華誕紀念文集, 文物出版社, 2002, 307-323

傅熹年. “宋式建筑的构架特点与‘减柱’问题.” In 宿白先生八秩華誕紀念文集, 307–23. 文物出版社, 2002. https://www.worldcat.org/title/su-bai-xian-sheng-ba-zhi-hua-dan-ji-nian-wen-ji-shang/oclc/952742478&referer=brief_results.

[...]

傅熹年, 宋式建筑的构架特点与‘减柱’问题, in 宿白先生八秩華誕紀念文集 (文物出版社, 2002), 307–23, https://www.worldcat.org/title/su-bai-xian-sheng-ba-zhi-hua-dan-ji-nian-wen-ji-shang/oclc/952742478&referer=brief_results.