正定隆興寺慈氏閣復原工程第一方案及說明
edition published: 2024-03-12-04:00
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

祁英濤, 英涛, Yingtao Qi, 正定隆興寺慈氏閣復原工程第一方案及說明, Zheng ding long yu si ci shi ge fu yuan gong cheng di yi fang an ji shuo ming, Zhengding longyusi cishige fuyuan gongcheng diyi fangan ji shuoming, https://architecturasinica.org/bibl/FBHTMDP2, https://www.zotero.org/groups/architecturasinica/items/FBHTMDP2, https://www.zotero.org/groups/2267085/items/FBHTMDP2, 祁英濤古建論文集, Qi Yingtao gu jian lun wen ji, Qi Yingtao gujian lunwenji, 北京, 華夏出版社, 1992a, 9-10

祁英濤. “正定隆興寺慈氏閣復原工程第一方案及說明.” In 祁英濤古建論文集, 9–10. 北京: 華夏出版社, 1992a.

[...]

祁英濤, 正定隆興寺慈氏閣復原工程第一方案及說明, in 祁英濤古建論文集 (北京: 華夏出版社, 1992a), 9–10.