山西省定襄县关王庙大殿建筑
edition published: 2024-03-12-04:00
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

青田 任, Qingtian Ren, 山西省定襄县关王庙大殿建筑, 山西省定襄縣關王廟大殿建築, Shanxi sheng dingxiang xian guan wang miao da dian jian zhu, Shanxisheng dingxiangxian guangwangmiao dadian jianzhu, https://architecturasinica.org/bibl/JQL63672, https://www.zotero.org/groups/architecturasinica/items/JQL63672, https://www.zotero.org/groups/2267085/items/JQL63672, 古建园林技术, 古建園林藝術, Gu jian yuan lin yi shu, Gujian yuanlin yishu, 2006, 35-37+66-67, 关王庙,位于山西省定襄县城北关,为定襄二中所占,现仅存大殿,山西省重点文物保护单位。殿内现存元至正碑一通,金泰和八年碣一块。据清雍正《定襄县志》和现存碑碣,关王庙始建于唐,为悯忠祠,元至正年间更名寿圣寺。现存大殿原为寿圣寺西配殿。元末寺废,独存西配殿,改用并称为关王庙至今。

任青田. “山西省定襄县关王庙大殿建筑.” 古建园林技术, no. 04 (2006): 35-37+66-67. http://kns.cnki.net/KCMS/detail/detail.aspx?dbcode=CJFQ&dbname=CJFD2006&filename=GJYL200604013&v=MDM3NTRxVHJXTTFGckNVUkxPZlplZHBGeS9sVnJ2T0lpZlNZckc0SHRmTXE0OUVaNFI4ZVgxTHV4WVM3RGgxVDM=.

[...]

任青田, 山西省定襄县关王庙大殿建筑, 古建园林技术, no. 04 (2006): 35-37+66-67, http://kns.cnki.net/KCMS/detail/detail.aspx?dbcode=CJFQ&dbname=CJFD2006&filename=GJYL200604013&v=MDM3NTRxVHJXTTFGckNVUkxPZlplZHBGeS9sVnJ2T0lpZlNZckc0SHRmTXE0OUVaNFI4ZVgxTHV4WVM3RGgxVDM=.