宁波保国寺大殿勘测分析与基础研究
edition published: 2024-03-12-04:00
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

十庆 张, Shiqing Zhang, 宁波保国寺大殿勘测分析与基础研究, 寧波保國寺大殿勘測分析與基礎研究, Ning bo bao guo si da dian kan ce fen xi yu ji chu yan jiu, Ningbo baoguo si dadian kance fenxi yu jichu yanjiu, https://architecturasinica.org/bibl/NVPQIK6D, https://www.zotero.org/groups/architecturasinica/items/NVPQIK6D, https://www.zotero.org/groups/2267085/items/NVPQIK6D, 南京, 東南大學出版社, 2013

张十庆. 宁波保国寺大殿勘测分析与基础研究. 南京: 東南大學出版社, 2013.

[...]

张十庆, 宁波保国寺大殿勘测分析与基础研究 (南京: 東南大學出版社, 2013).