Temple of Confucius in Qufu 曲阜孔廟
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Temple of Confucius in Qufu; Qūfù Kǒngmiào; Ch`ü-fu K'ung-miao; 曲阜孔廟; 曲阜孔庙
identifier: https://architecturasinica.org/place/000081
identifier: http://sws.geonames.org/9072554/
Dynasty: Jin 1115 - 1234
Wikipedia (in English)
Wikipedia (in Chinese)
百度百科
location: 山东省曲阜县, Shandong, China, Shandong 山東省 山东省, Qufu 曲阜, 县 County
location: 35.5955833 116.98405
Type: temple, miao, 廟, 庙
12