Erxian Temple in Xilimen, middle hall 西李門二仙廟中殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

middle hall; 中殿; 中殿; zhōngdiàn; chung-tien; Xilimen Erxianmiao zhongdian; 西李門二仙廟中殿; 西李门二仙庙中殿; Erxianmiao
identifier: https://architecturasinica.org/place/000255
Date: 1157
Dynasty: Jin 1115 - 1234
location: 35.7030833 112.9776
location: [35˚ 42.185' N (Garmin) 112˚ 58.656' E]
Type: palatial hall, dian, 殿, 殿
12