Fujun Temple in Zhangzi, main hall 長子府君廟正殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

main hall; 正殿; 正殿; zhèngdiàn; cheng-tien; Zhangzi Fujun Temple main hall; 长子县府君廟正殿; 长子县府君庙正殿
identifier: https://architecturasinica.org/place/000274
Dynasty: Song-Ming 960 - 1644
location: 36.11985 112.8771667
location: [36˚ 07. 191' 112˚ 52.630']
The main hall (正殿) of the Fujun Temple faces south on stone podium. It is 5 bays wide across the front and 6 rafters deep with a single eaves, hip gable roof. The column top and intercolumnar bracket sets are 5 steps, with double slanting arms. Restoration makes the original appearance difficult to ascertain.
II (中): 362; 111-C18
12