Zhaoren Monastery, main hall 昭仁寺大殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

main hall; 大殿; 大殿; dàdiàn; ta-tien; Zhaorensi dadian; 昭仁寺大殿; 昭仁寺大殿; Dadian
identifier: https://architecturasinica.org/place/000275
Date: 618-907
Dynasty: Tang 618 - 907
location: [35˚ 12' 15.89" N found on google earth, no satellite 107˚ 47' 50.63" E]
Type: palatial hall, dian, 殿, 殿
12
Date of main hall not listed in ZGMSCD, p. 1026; Is this really Tang?