Erxian Palace in Zhongping, main hall 中坪二仙宮正殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

main hall; 正殿; 正殿; zhèngdiàn; cheng-tien; Zhongping Erxiangong zhengdian; 中坪二仙宫正殿; 中坪二仙宫正殿; Erxiangong Shanmen
identifier: https://architecturasinica.org/place/000281
Date: 1125-1234
Dynasty: Jin 1115 - 1234
location: 35.8061166 113.069833
location: [35˚ 48.367 N (Garmin) 113˚ 04.190' E]
Type: palatial hall, dian, 殿, 殿
12