Chengtang Temple 成湯廟
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Chengtang Temple; Chéngtāngmiào; Ch`eng-t`ang-miao; 成湯廟; 成汤庙
identifier: https://architecturasinica.org/place/000010
Dynasty: Jin 1115 - 1234
Wikipedia (in Chinese)
百度百科
location: 河北省邯鄲涉县, Hebei, China, Hebei 河北省 河北省, 邯鄲, 市 City, 涉
Type: temple, miao, 廟, 庙
12