Baiyu Palace, back hall 白玉宮後殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

back hall; 後殿; 后殿; houdian; Hou-tien; Baiyugong houdian; 白玉宫後殿; 白玉宫后殿; Houdian
Date: 1368-1911
Dynasty: Ming 1368 - 1644
The back hall of Baiyu Palace is on the central axis and dates to the Ming-Qing dynasties. It has an overhanging gable roof, its front façade measures 9.32 m (30' 7").
identifier: https://architecturasinica.org/place/000131
location: 35.65833 113.240967
location: [35° 39.500' (±23ft) 113° 14.458' (±23ft)]
Type: palatial hall, dian, 殿, 殿
12
II:513; 23-C10