Chunhua Monastery, main hall 淳化寺正殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

main hall; 正殿; 正殿; zhèngdiàn; Cheng-tien; Chunhuasi zhengdian; 淳化寺正殿; 淳化寺正殿
identifier: https://architecturasinica.org/place/000153
Date: 1125-1234
Dynasty: Jin 1115 - 1234
location: 36.3532333 113.5862
location: [36˚ 21.194'N (Garmin) 113˚ 35.172']
Type: palatial hall, dian, 殿, 殿
12