Cixiang Monastery, main hall 慈相寺正殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

main hall; 正殿; 正殿; zhèngdiàn; Cheng-tien; Cixiangsi zhengdian; 慈相寺正殿; 慈相寺正殿
identifier: https://architecturasinica.org/place/000154
Date: 1125-1234
Dynasty: Jin 1115 - 1234
location: 37.23389444 112.2438056
location: [37˚14' 02.02" N (fuzzy satellite following 赝能隙 photo) 112˚ 14' 37.72"]
Type: palatial hall, dian, 殿, 殿
12