Dabei Cloister in Quwo, passage hall 曲沃大悲院過殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

passage hall; 過殿; 过殿; guòdiàn; Kuo-tien; Quwo Dabeiyuan Guodian; 曲沃大悲院過殿; 曲沃大悲院过殿
identifier: https://architecturasinica.org/place/000156
Date: 1180
Dynasty: Jin 1115 - 1234
location: 35.73436667 111.5450667
location: [35˚ 44。062 111˚ 32.704']
Type: palatial hall, dian, 殿, 殿
12